Scankit Utility Installation

All topics are listed below :

Scanner Interface Card

Setting the I/O Address


Setting the I/O Address

The scanner interface card has switches for changing the I/O address. Inspect the card closely and see what the current I/O address is.You can use the recommended I/O address 2AB unless you have a device that uses the same I/O address.

Most conflicts occur when there are several devices/cards such as modems, fax cards, mouse cards, etc. installed in your computer. It is important that you know the settings used by each device so you could assign an unused settings for the scanner interface card. In some cases, it may be necessary for you to change the I/O address settings of device to accomdate the scanner interface card.

Figures below show the available I/O address on the scanner interface card.The small white squares represent the movable parts of the switch.

 22B              26B              2AB             2EB

 32B              36B              3AB             3EB


Scanner Interface Card

We now support three types of scanner interface card. They are :

                                      GI1904 Scanner Interface Card

                                      GI1906 Scanner Interface Card

                                      PRINSCAN Scanner Interface Card

See Also Setting the I/O Address