Setting of SCSI Scanner Interface Card
Settings of SCSI Scanner Interface Card

1. The scanner interface card needs a continuous memory space which size is 16K bytes and its starting address is set to either C800, CC00, D000, D400, D800, DC00, E000 or E400.

2. It is necessary to EXCLUDE memory space that will be used by  the scanner interface card . Table below shows the address switchs and memory space used respectively. NOTE that the address you select MUST not conflict with other devices and EMS page frame.

For example : If EMM386 or QEMM386 is installed and address switch is switched to D800, you could append parameter X=D800-DBFF to the end of device=emm386(qemm386)  ... to exclude the memory space.

         D800 ~ DBFF

         C800 ~ CBFF

         E000 ~ E3FF

         D000 ~ D3FF

         DC00 ~ DFFF

         CC00 ~ CFFF

         E400 ~ E7FF

         D400 ~ D7FF

3. Load some device drivers or TSRs  to conventional memory rather than to the UMBs in order to reserve memory spcae for  scanner interface card if needed.

4. It is suggested to TURN OFF your computer and then turn on later  after the CONFIG.SYS is modified.


Scantest

1. Put the object to be scanned on the scanner.

2. Click "Scantest" button.

3. The image will be scanned in Line-Art scan mode and resolution 36 dpi.

4. Image will be displayed on a window.

5. After success in scantesting , click "Install" button to continue installation procedure.