Setting of SCSI Scanner Interface Card
Settings of SCSI Scanner Interface Card

1. The scanner interface card needs an I/O port address selection which is set to either 0280, 0290, 0300, 0310, 0330, 0340, 0348 or 0350.

   ( default is 0280 )

         280 ~ 28F	.          330 ~ 33F

         290 ~ 29F	.         340  ~ 34F

         300 ~ 30F	.          348 ~ 357

         310 ~ 31F	.          350 ~ 35F

2.  If you have any other device(s) in your computer which is using an I/O port, please check the used I/O port address(es) and set the scanner interface card to a free I/O port.