InS_StArT
L100.COM
1.0
^Siemens OfficeLAN PCI 10/100 TX Fast Ethernet Adapter,L100.COM,0E0
?This driver supports Siemens OfficeLAN PCI 10/100 TX Fast Ethernet Adapter for PCI machines
*O0E0(FRAME)Media Frame Type(s)
?NOTE: Ethernet_802.2 is now the default frame type for ODI Drivers.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD
