Help File - this is the comment section, next section is the index and last
section contains the help messages
%%
.!Main Menu
1,1:1
1,2:2
1,3:3
1,4:4
.!Diagnostic Options
2,1:10
2,2:11
2,3:12
2,4:13
2,5:14
2,6:15
2,7:16
2,8:17
.!Select-Deselect Test Menu
3,1:20
3,2:21
3,3:22
3,4:23
3,5:24
3,6:25
3,7:26
.! FATAL Error messages
4,1:40
4,2:40
4,3:40
4,4:40
4,5:40
4,6:40
4,7:40
4,8:40
4,9:48
4,10:40
4,11:49
4,12:40
4,13:40
4,14:40
4,15:41
4,16:42
4,17:43
4,18:44
4,19:40
4,20:45
4,21:40
4,22:46
4,23:40
4,24:40
4,25:40
4,26:40
4,27:40
4,28:40
4,29:40
4,30:47
4,31:40
4,32:40
4,33:40
4,34:40
4,35:40
4,36:40
4,37:40
4,38:40
4,39:40
4,40:40
5,1:35
%%
.1
Run Card Diagnostics

 Choosing this option will enable you to do either local Card
 diagnostics or diagnostics on the network.

 The local card diagnostic will test the following functions,
 unless deselected by the select/deselect function within the
 Change Diagnostic Options selection.

  1) Check Card Information Structure (CIS)
  2) Tx chip test
  3) 82595 test
  4) Data Bus test
  5) Addr Bus test
  6) Random memory test
  7) IRQ test

 The network diagnostics will transmit packets onto the LAN and
 packets sent and received are counted together with counters for
 packet, collision, underrun and overrun errors.

                                                 (ESC = continue)
.2
Run Network Responder

 Sets up a Olicom Ethernet PCMCIA card as a network responder. This
 option is used together with another station on the LAN running
 network diagnostics.

 The station will echo packets sent by the station running network 
 diagnostics.

 You can stop the responder by pressing the ESC key at any time.

                                                        (ESC = continue)
.3
View Card Configuration
.! Comment

View the configured Ethernet PCMCIA card(s). Information
shown is:

    Card Powered Status
    I/O Address Range
    Interrupt Level
    Ethernet Node Address (burned-in)

                                                    (ESC = continue)
.4
Quit Diagnostic

Exit from DIAG program

      (ESC = continue)
.10
Continue With Tests

 Choose continue with tests to test the adapter.

 If more than one PCMCIA Ethernet adapter is present in your system, 
 you are prompted for a Ethernet adapter to test. You may choose
 to run on-board diagnostics on all adapters in your system.

 Only the tests that are selected through the Select/Deselect
 adapter test option (under the Diagnostic Option) are 
 executed.

                                                (ESC = continue)
.11
Continue with network test

 Choose continue with network test to test the adapter and the
 connection between the adapter and the network. If you set up
 a responder workstation, the adapter will be tested more 
 thoroughly.
 
 If more than one PCMCIA Ethernet adapter is present in your system, 
 you are prompted for a Ethernet adapter to test.

                                             (ESC = continue)
.12
Select/Deselect Tests

Select the set of tests to be executed. In the Select/Deselect
Tests Menu use <ENTER> to toggle between SELECT and DESELECT.

                     (ESC = continue)
.13
Enable/Disable Diagnostic Log

Enable or disable output of the test results to a file. The output
file (or log file) is named DIAGLOG.TXT. The log file is a normal DOS
text file which may be viewed using a standard editor or the TYPE
command.

                                                     (ESC = continue)
.14
Display Contents of log file

Display the logged diagnostic messages.

                      (ESC = continue)
.15
Set Number of Test Rounds

Specify the number of times you want the selected set of tests
to be executed. The default value is 1.

                                              (ESC = continue)
.16
Set Number of Frames To Send

Specify the number of frames sent during network diagnostic.
The default value is 1000.

                                              (ESC = continue)
.17
Back

Return to Previous Menu

       (ESC = continue)
.20
Card Information Structure (CIS) test

The Card Information Structure have been checked by OCTENABL card
enabler during load, if your system runs with the card enabler.
DIAG makes consistency checks if running on top of socket- and card-
Services.

                                                        (ESC = continue)
.21
Tx chip test

Execute tests that ensure that an 82595tx chip is present.

                                                        (ESC = continue)
.22
82595tx test

Setup 82595tx controller for operation.

NOTE: This test can not be deselected.
                                                        (ESC = continue)
.23
Data Bus test


Check that all data patterns can be written/read from the card memory.

                                                        (ESC = continue)
.24
Memory test - Addr bus

Check that all address bits function correctly.

                                                        (ESC = continue)
.25
Memory test - Random

Random test pattern are written to and read from card memory and
compared for any mismatch.
                                                        (ESC = continue)
.26
IRQ test

Check that interrupt system responds correctly.

                                                        (ESC = continue)
.35
Network responder

 This station is now running as a network responder and will
 echo packets transmitted from another station on the LAN 
 running network diagnostics.

 The packets received counter indicates the number of packets
 received from the station running network diagnostics.

 The packets sent counter indicates the number of echo-packets
 sent to the station running network diagnostics.

 You may press ESC at any time to stop the network responder.

                                              (ESC = continue)
.40
Help Message

Unknown Error code - No help available

                      (ESC = continue)
.41
Help Message

0015 TxChip Test.
     The PCMCIA Card was not able to perform 16bit read & write
     operation.

     Action: Card is faulty.

                                                        (ESC = continue)
.42
Help Message

0016 TxChip Test.
     The PCMCIA Card was not able to perform 16bit read & write
     operation.

     Action: Card is faulty.

                                                        (ESC = continue)
.43
Help Message

0017 82595Tx Chip Test.
     The PCMCIA Card was not able to perform initial setup.

     Action: Card is faulty.

                                                        (ESC = continue)
.44
Help Message

0018 Data Bus Test. (errno=xxxx)
     The PCMCIA Card was not able to read and write all values
     (i.e. 0 - 0xffff) across the data bus.

     xxxx Meaning
     ---- -------
     data data bit failed

     Action: Card is faulty.

                                                        (ESC = continue)
.45
Help Message

0020 Address Bus Test. (errno=xxxx)
     The PCMCIA Card was not able to address all locations in
     the on-board RAM.

     xxxx Meaning
     ---- -------
     addr address bit failed

     Action: Card is faulty.

                                                        (ESC = continue)
.46
Help Message

0022 Random Memory Test.  (errno=xxxx)
     The PCMCIA Card was not able to write and read a random
     test-pattern to/from the on-board RAM.

     xxxx Meaning
     ---- -------
     addr data mismatch at addr

     Action: Card is faulty.

                                                        (ESC = continue)
.47
Help Message

0030 IRQ Test. (errno=xxxx)
     The PCMCIA Card was not able to generate interrupt. The test is
     executed with the card in 'Internal Loop-Back mode'. If Rx interrupt
     is missing, ensure that the cable is correctly attached to the card.

     xxxx Meaning
     ---- -------
     002f Unable to Reset/Setup the PCMCIA card for IRQ/loopback test.
     0030 Tx Interrupt missing
     0031 (as 0030)
     0032 (as 0030)
     0033 Rx Interrupt missing
     0034 (as 0033)

                                                        (ESC = continue)
.48
Help Message

0009 CIS Test.
     The CIS (Card Information Structure) of the PCMCIA Card
     was corrupted. 

     Action: Card is faulty.

                                                        (ESC = continue)
.49
Help Message

0011 CIS Test.
     The CIS (Card Information Structure) of the PCMCIA Card
     didn't contain correct information.

     Action: Card is faulty.

                                                        (ESC = continue)
.End
