Copyright: Compex Inc.


Compex RL100ATX 10/100 Base PCI Ethernet Adapter

Use this dialog box to setup the Line Speed for Compex RL100ATX 10/100 Base PCI Ethernet Adapter.

AutoDetect

10M

100M


AutoDetect
Autodetect the Line Speed connected to the  Adapter and dynamically switch to the proper line speed ( 10M or 100M).


10_Base
Select the 10BaseT medium connection.


100_M
Select the 100 M medium connection .