 Key Functions

Button	Description	Function	Key
	Power On/Off	Off the radio	Q
	Help	Goto the help screen	H
	Fine Tune Set Auto Min	Increase/decrease the tuning frequency by 0.025 MHz Increase/decrease the minute setting of Auto	left/ right arrow
	Tune Up/Down Set Auto Hour Set Timer time	Increase/decrease the tuning frequency by 0.1 MHz.Increment/decrease the hour setting of Auto Increment/decrease the minute setting of Timer	up/ down arrow
	Scan	Used to set the radio into scan mode, i.e searching to the next station.
	Vol Up/Down	Increase/Decrease Volume	+/-
	Mute	Off the sound	M
	Timer	Radio is mute after the predefined time  (in minutes)	L
	Timer off	Turn off the Timer	U
	Auto On	Radio is on at the predefined time Radio would be tuned to the station when auto is set	A
	Stations 1-10	Tune to any of the 10 predefine channel	0-9
	Memory Preset	Save the current frequency setting to one of the 10 preset station.	P
	Resize button	Click to resize the panel
	RadioREVEAL Logo	Click the logo would iconize the panel
	Any other regions on the Panel	Click on any other regions of the panel and drag to move the panel.
		Set Radio Panel to be always on Top	T
		Set Radio Panel to normal mode (not always on Top)	N